---
title: "Wix"
description: "Add Pulse analytics to your Wix site via Custom Code settings."
category: "platform"
brandColor: "#0C6EFC"
officialUrl: "https://support.wix.com"
relatedIds: ["webflow", "squarespace", "framer"]
date: "2026-03-28"
---

Use Wix's Custom Code settings to add the Pulse script.

---

## Add via Custom Code

Go to **Settings -> Custom Code -> Add Custom Code**. Set the placement to **Head** and apply it to **All pages**.

```html filename="Custom Code Snippet"
<script
  defer
  data-domain="your-site.com"
  src="https://pulse.ciphera.net/script.js"
></script>
```

**Note:** Custom Code requires a Wix Premium plan.

For more details, see the [Wix custom code docs](https://support.wix.com/en/article/embedding-custom-code-on-your-site).
