---
title: "Script Tag"
description: "Add privacy-first analytics to any website with a single script tag. Works with any platform, CMS, or framework."
category: "platform"
brandColor: "#F97316"
officialUrl: "https://pulse.ciphera.net"
relatedIds: []
date: "2026-03-28"
---

Add Pulse to any website by pasting a single script tag into your HTML. This works with any platform, CMS, or static site.

---

## Installation

Add the following script tag inside the `<head>` section of your website:

```html filename="index.html"
<head>
  <!-- ... other head elements ... -->
  <script
    defer
    src="https://pulse.ciphera.net/script.js"
    data-domain="your-site.com"
  ></script>
</head>
```

## Configuration

- `data-domain` — your site's domain as shown in your Pulse dashboard (e.g. `example.com`), without `https://`
- `defer` — loads the script without blocking page rendering

## Where to paste the script

Most platforms have a "Custom Code", "Code Injection", or "Header Scripts" section in their settings. Look for one of these:

- **Squarespace:** Settings -> Developer Tools -> Code Injection -> Header
- **Wix:** Settings -> Custom Code -> Head
- **Webflow:** Project Settings -> Custom Code -> Head Code
- **Ghost:** Settings -> Code Injection -> Site Header
- **Any HTML site:** Paste directly into your `<head>` tag

## Verify installation

After deploying, visit your site and check the Pulse dashboard. You should see your first page view within a few seconds.
