---
title: "Webflow"
description: "Add Pulse analytics to your Webflow site via project custom code settings."
category: "platform"
brandColor: "#146EF5"
officialUrl: "https://university.webflow.com"
relatedIds: ["squarespace", "wix", "framer"]
date: "2026-03-28"
---

Paste the Pulse script into your Webflow project's custom code settings.

---

## Add via Project Settings

Go to **Project Settings -> Custom Code -> Head Code** and paste the Pulse script.

<CodeBlock filename="Project Settings -> Head Code">{`<script
  defer
  data-domain="your-site.com"
  src="https://pulse.ciphera.net/script.js"
></script>`}</CodeBlock>

**Note:** Custom code requires a paid Webflow site plan. The script won't appear in the Designer preview — publish your site to see it in action.

For more details, see the [Webflow custom code docs](https://university.webflow.com/lesson/custom-code-in-the-head-and-body-tag).
