---
title: "Framer"
description: "Add Pulse analytics to your Framer site via custom code settings."
category: "platform"
brandColor: "#0055FF"
officialUrl: "https://www.framer.com/help"
relatedIds: ["webflow", "squarespace", "wix"]
date: "2026-03-28"
---

Add the Pulse script to your Framer project's custom code settings.

---

## Add via Project Settings

Go to **Project Settings -> General -> Custom Code -> Head** and paste the Pulse script.

```html filename="Project Settings -> Head"
<script
  defer
  data-domain="your-site.com"
  src="https://pulse.ciphera.net/script.js"
></script>
```

For more details, see the [Framer custom code docs](https://www.framer.com/help/articles/custom-code/).
